-- Add only_in_stock toggle to configuration settings persisted in MariaDB.
ALTER TABLE qt_configurations
    ADD COLUMN IF NOT EXISTS only_in_stock BOOLEAN NOT NULL DEFAULT FALSE AFTER disable_price_refresh;
